Table 3. Atomic weights and solar-system abundances

Element Z Atomic weight Abundance Element Z Atomic weight Abundance

H 1 1.00794 12.00 Pd 46 105.42 1.70 He 2 4.002602 10.99 Ag 47 107.8682 1.24 Li 3 6.941 3.31 Cd 48 112.411 1.76 Be 4 9.012182 1.42 In 49 114.82 0.82 B 5 10.811 2.88 Sn 50 118.710 2.14

C 6 12.011 8.56 Sb 51 121.75 1.04 N 7 14.00674 8.05 Te 52 127.60 2.24 O 8 15.9994 8.93 I 53 126.90447 1.51 F 9 18.9984032 4.48 Xe 54 131.29 2.23 Ne 10 20.1797 8.09 Cs 55 132.90543 1.12

Na 11 22.989768 6.31 Ba 56 137.327 2.21 Mg 12 24.3050 7.58 La 57 138.9055 1.20 Al 13 26.981539 6.48 Ce 58 140.115 1.61 Si 14 28.0855 7.55 Pr 59 140.90765 0.78 P 15 30.973762 5.57 Nd 60 144.24 1.47

S 16 32.066 7.27 Pm 61 * Cl 17 35.4527 5.27 Sm 62 150.36 0.97 Ar 18 39.948 6.56 Eu 63 151.965 0.54 K 19 39.0983 5.13 Gd 64 157.25 1.07 Ca 20 40.078 6.34 Tb 65 158.92534 0.33

Sc 21 44.955910 3.09 Dy 66 162.50 1.15 Ti 22 47.88 4.93 Ho 67 164.93032 0.50 V 23 50.9415 4.02 Er 68 167.26 0.95 Cr 24 51.9961 5.68 Tm 69 168.93421 0.13 Mn 25 54.93805 5.53 Yb 70 173.04 0.95

Fe 26 55.847 7.51 Lu 71 174.967 0.12 Co 27 58.93320 4.91 Hf 72 178.49 0.73 Ni 28 58.69 6.25 Ta 73 180.9479 0.13 Cu 29 63.546 4.27 W 74 183.85 0.68 Zn 30 65.39 4.65 Re 75 186.207 0.27

Ga 31 69.723 3.13 Os 76 190.2 1.38 Ge 32 72.61 3.63 Ir 77 192.22 1.37 As 33 74.92159 2.37 Pt 78 195.08 1.68 Se 34 78.96 3.35 Au 79 196.96654 0.83 Br 35 79.904 2.63 Hg 80 200.59 1.09

Kr 36 83.80 3.23 Tl 81 204.3833 0.82 Rb 37 85.4678 2.40 Pb 82 207.2 2.05 Sr 38 87.62 2.93 Bi 83 208.98037 0.71 Y 39 88.90585 2.22 Zr 40 91.224 2.61 Th 90 232.0381 0.08

Nb 41 92.90638 1.40 U 92 238.0289 �0:49 Mo 42 95.94 1.96 Tc 43 * Ru 44 101.07 1.82 * Radioactive element without Rh 45 102.90550 1.09 characteristic isotopic composition